import Image from "next/image"

export default function CareersSection() {
  return (
    <section className="section pd-top-0 overflow-hidden">
      <div className="w-layout-blockcontainer container-default w-container">
        <div data-w-id="57c6d91a-ff5b-0c4b-0e98-f6574583d612" style={{"opacity": "0", "filter": "blur(8px)"}} className="inner-container _650px center">
          <div className="text-center">
            <div className="subtitle">Investors</div>
            <div className="mg-top-4x-extra-small">
              <h2>
    We partner with purpose-driven investors                </h2>
            </div>
            <div className="mg-top-4x-extra-small">
              <div className="inner-container _566px center">
                <p>
    ipsum dolor sit amet consectetur netus quis ac varius ut nam est tellus ut porttitor ut volutpat malesuada rhoncus quis lacus augue ac urna et eget elementum at elit.                  </p>
              </div>
            </div>
          </div>
        </div>
        <div className="mg-top-regular">
          <div data-w-id="97dc1372-f411-c523-0bef-128c83baf08b" style={{"opacity": "0", "filter": "blur(8px)"}} className="logo-strip-marquee-wrapper">
            <div className="logo-strip-marquee marquee-scroll-item">
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876a4098611a628c081a_linkora-logo-quantum-webflow-template.svg" width={125} height={33} alt="Linkora Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876a23b74de53cc9a64f_converra-logo-quantum-webflow-template.svg" width={130} height={33} alt="Converra Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876a24ff0842f7ea9e4f_nexora-logo-quantum-webflow-template.svg" width={110} height={33} alt="Nexora Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876ba1593ccde3aeb482_syncell-logo-quantum-webflow-template.svg" width={119} height={33} alt="Syncell Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876c0f4d2d1856ba6b88_socium-logo-quantum-webflow-template.svg" width={125} height={33} alt="Socium Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876bee27e15bc9b9e5a8_bridgr-logo-quantum-webflow-template.svg" width={109} height={33} alt="Bridgr Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876a6c28f60e0f1858b8_netspire-logo-quantum-webflow-template.svg" width={121} height={33} alt="Netspire Logo - Quantum | Webflow Template" className="logo-strip-item" />
            </div>
            <div className="logo-strip-marquee marquee-scroll-item">
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876a4098611a628c081a_linkora-logo-quantum-webflow-template.svg" width={125} height={33} alt="Linkora Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876a23b74de53cc9a64f_converra-logo-quantum-webflow-template.svg" width={130} height={33} alt="Converra Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876a24ff0842f7ea9e4f_nexora-logo-quantum-webflow-template.svg" width={110} height={33} alt="Nexora Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876ba1593ccde3aeb482_syncell-logo-quantum-webflow-template.svg" width={119} height={33} alt="Syncell Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876c0f4d2d1856ba6b88_socium-logo-quantum-webflow-template.svg" width={125} height={33} alt="Socium Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876bee27e15bc9b9e5a8_bridgr-logo-quantum-webflow-template.svg" width={109} height={33} alt="Bridgr Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876a6c28f60e0f1858b8_netspire-logo-quantum-webflow-template.svg" width={121} height={33} alt="Netspire Logo - Quantum | Webflow Template" className="logo-strip-item" />
            </div>
            <div className="logo-strip-marquee marquee-scroll-item">
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876a4098611a628c081a_linkora-logo-quantum-webflow-template.svg" width={125} height={33} alt="Linkora Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876a23b74de53cc9a64f_converra-logo-quantum-webflow-template.svg" width={130} height={33} alt="Converra Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876a24ff0842f7ea9e4f_nexora-logo-quantum-webflow-template.svg" width={110} height={33} alt="Nexora Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876ba1593ccde3aeb482_syncell-logo-quantum-webflow-template.svg" width={119} height={33} alt="Syncell Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876c0f4d2d1856ba6b88_socium-logo-quantum-webflow-template.svg" width={125} height={33} alt="Socium Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876bee27e15bc9b9e5a8_bridgr-logo-quantum-webflow-template.svg" width={109} height={33} alt="Bridgr Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876a6c28f60e0f1858b8_netspire-logo-quantum-webflow-template.svg" width={121} height={33} alt="Netspire Logo - Quantum | Webflow Template" className="logo-strip-item" />
            </div>
            <div className="logo-strip-marquee marquee-scroll-item">
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876a4098611a628c081a_linkora-logo-quantum-webflow-template.svg" width={125} height={33} alt="Linkora Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876a23b74de53cc9a64f_converra-logo-quantum-webflow-template.svg" width={130} height={33} alt="Converra Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876a24ff0842f7ea9e4f_nexora-logo-quantum-webflow-template.svg" width={110} height={33} alt="Nexora Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876ba1593ccde3aeb482_syncell-logo-quantum-webflow-template.svg" width={119} height={33} alt="Syncell Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876c0f4d2d1856ba6b88_socium-logo-quantum-webflow-template.svg" width={125} height={33} alt="Socium Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876bee27e15bc9b9e5a8_bridgr-logo-quantum-webflow-template.svg" width={109} height={33} alt="Bridgr Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876a6c28f60e0f1858b8_netspire-logo-quantum-webflow-template.svg" width={121} height={33} alt="Netspire Logo - Quantum | Webflow Template" className="logo-strip-item" />
            </div>
            <div className="logo-strip-marquee marquee-scroll-item">
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876a4098611a628c081a_linkora-logo-quantum-webflow-template.svg" width={125} height={33} alt="Linkora Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876a23b74de53cc9a64f_converra-logo-quantum-webflow-template.svg" width={130} height={33} alt="Converra Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876a24ff0842f7ea9e4f_nexora-logo-quantum-webflow-template.svg" width={110} height={33} alt="Nexora Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876ba1593ccde3aeb482_syncell-logo-quantum-webflow-template.svg" width={119} height={33} alt="Syncell Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876c0f4d2d1856ba6b88_socium-logo-quantum-webflow-template.svg" width={125} height={33} alt="Socium Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876bee27e15bc9b9e5a8_bridgr-logo-quantum-webflow-template.svg" width={109} height={33} alt="Bridgr Logo - Quantum | Webflow Template" className="logo-strip-item" />
              <Image src="/assets/wubflow-shield-nocodexport-dev/68a342b7066c56fa60eb3af1/68a7876a6c28f60e0f1858b8_netspire-logo-quantum-webflow-template.svg" width={121} height={33} alt="Netspire Logo - Quantum | Webflow Template" className="logo-strip-item" />
            </div>
          </div>
        </div>
      </div>
    </section>
  )
}
